WMAP Cosmological Parameters Model: m2phi2 Data: wmap 10^2Ω_bh^2 2.218 ± 0.045 Δ^2_R(k = 0.002/Mpc) (22.2 ± 1.3) × 10^{−10} h 0.741 ± 0.029 H_0 74.1 ± 2.9 km/s/Mpc log(10^{10}A_s) 3.099 ± 0.057 Ω_bh^2 0.02218 ± 0.00045 Ω_ch^2 0.1010^{+0.0074}_{−0.0075} Ω_Λ 0.773 ± 0.031 Ω_m 0.227 ± 0.031 Ω_mh^2 0.1232 ± 0.0076 σ_8 0.734 ± 0.046 τ 0.081 ± 0.027 θ_A 0.5937 ± 0.0016^∘ z_r 10.2 ± 2.4