0 10 20 30 40 50 60 70

0 500 1000 1500 2000 2500 3000 3500 4000

0

0.2

0.4

0.6 x 10^{-6}

0 500 1000 1500 2000 2500 3000 3500 4000 δT_{RMS} (μK) l=2πu

Window function u W(u)