WMAP Cosmological Parameters Model: lcdm Data: all 10^2Ω_bh^2 2.186 ± 0.068 Δ^2_R(k = 0.002/Mpc) (24.0 ± 1.2) × 10^{−10} h 0.704^{+0.015}_{−0.016} H_0 70.4^{+1.5}_{−1.6} km/s/Mpc log(10^{10}A_s) 3.175 ± 0.052 n_s(0.002) 0.947 ± 0.015 Ω_bh^2 0.02186 ± 0.00068 Ω_ch^2 0.1105^{+0.0039}_{−0.0038} Ω_Λ 0.732 ± 0.018 Ω_m 0.268 ± 0.018 Ω_mh^2 0.1324^{+0.0042}_{−0.0041} σ_8 0.776^{+0.031}_{−0.032} τ 0.073^{+0.027}_{−0.028} θ_A 0.5947 ± 0.0019^∘